%&LaTeX
\documentclass{article}

\usepackage[latin1]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{AlexanderKiselev+SergeyBogatov2012} Alexander Kiselev, \& Sergey Bogatov. (2012). Model PROLOG for countermeasures efficacy assessment and its calculation algorithm verification on the base of the Chazhma Bay accident data. In Z.Franco J. R. L. Rothkrantz (Ed.), \textit{ISCRAM 2012 Conference Proceedings -- 9th International Conference on Information Systems for Crisis Response and Management}. Vancouver, BC: Simon Fraser University.

\end{thebibliography}

\end{document}

